Spectr oscopic Mechanical SubSystem

Telescope Suppor t Motor s, encoder s

Wind Baffle motor , ser vo

Misc...

2.5 Met er TCC

Site WX

Consoles (2)

Oper ation Repor t

All sky Camer a

Spect roscopic Online Syst em

Site Time

Photometr ic Online Scr olling Displays (6)

Astr ometr ic Online Scr olling Displays (3)

SDSS Host Comput er Syst em

Monitor Telescope & Suppor t

MT Camer a & Suppor t

Monit or Telescope Host Comput er Syst em

MTCC

Monitor Telescope Console

Monitor Telescope Online Display

Spectr oscopic Guider

Spectoscopic Camer a SubSystem

Pr imar y Photometr ic Data Ar chives

Ar chives, Except Photometr ic and MT

Quality Displays (Up to 6 Networ k Based displays)

Spectr oscopic Online Displays (2)

Monitor Telescope Data Ar chives

Fig 1

Imaging Online Syst em

Photometr ic Online System

Astr ometr ic Online System

Autofocus Online System

Imaging Camer a

Astr ometr icCamer a

Photometr ic Camer a

Autofocus Camer a

Har dCopy

Monitor Telescope Online System

Oper ation Plans

Plate Handling System

Oper ation Plan